delta PHI CLMP - MWPC1

PHI MWPC vs. CsI

0

1000

2000

3000

-80 -60 -40 -20 0 20 40 60 80

ID 91002 Constant 2504. 5.052 Mean -0.9200E-01 0.1031E-01 Sigma 6.670 0.8518E-02

1999/11/11 15.17

delta PHI CLMP - MWPC2 0 1000

2000

3000

4000

-80 -60 -40 -20 0 20 40 60 80

ID 91003 Constant 3711. 7.615 Mean 0.6645 0.6890E-02 Sigma 4.388 0.5829E-02

delta PHI CLMP - MWPC projection 0 500 1000

1500

2000

-80 -60 -40 -20 0 20 40 60 80

ID 91004 Constant 2005. 6.002 Mean 1.202 0.8929E-02 Sigma 4.006 0.7837E-02