Calculated vectors of γs

-0.4

-0.3

-0.2

-0.1

0

0.1

0.2

0.3

0.4

1.8 1.9 2 2.1 2.2 2.3 2.4 2.5 Theta ΜradΝ

Phi ΜradΝ

Center of mass vectors of γ showers

-0.4

-0.3

-0.2

-0.1

0

0.1

0.2

0.3

0.4

1.8 1.9 2 2.1 2.2 2.3 2.4 2.5 Theta ΜradΝ

Phi ΜradΝ